PHYS 1313 Grading Policy

Homework: 15% Lab Reports: 20% Spot Quizzes: 15% Tests: 25% Final Examination: 25%

Spot quizzes are unannounced and closed book. Tests and the final are open book and open note. Homework is counted as either handed in (50% of the problems are honestly attempted) or not handed in.

Final course grades are “curved”. Effort is rewarded and will be considered when the final grades are determined.