-0.4

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

5 10 15 20 25 30 35 40 45 50 55 60 65 70 x(t)-Correlation plot

x-Distance from the Wire ΜcmΝ

Minimum Drift Time ΜμsecΝ

*10^{-3}_{Gasϑ Ar 80Ψ, CO2 20Ψ, T=300 K, p=1 atm}^{Angle to y = 0.00 degrees}

Wire no = 1 (type S)